-- Idempotent update: add frontend telemetry settings defaults.

INSERT INTO `settings` (`key`, `value`, `description`)
VALUES
  ('frontend_telemetry_enabled', '0', 'setting.frontend_telemetry_enabled'),
  ('frontend_telemetry_sample_rate', '0.2', 'setting.frontend_telemetry_sample_rate'),
  ('frontend_telemetry_allowed_events', 'warn_once,ajax_error', 'setting.frontend_telemetry_allowed_events')
ON DUPLICATE KEY UPDATE
  `key` = `key`;
